Pop up stand
Case wrap

Cut size-
1810mm x 785mm

Bleed (10mm)

The bleed area extends 10mm beyond the edge of your finished document. Colours and images must extend beyond the edge of the document to prevent unwanted white borders around the edge of your finished document. Note that this ‘bleed’ will be trimmed during the finishing process so ensure that no important details are set up to print in this area

Safe Area (5mm)

it is recommended that your artwork is at least 10mm from the edge of the page if it is not meant to bleed off. Printed borderd placed too close to the edge of a page may look uneven when job is trimmed.

Panel size-
270mm

Panel size-
350mm

Panel size-
540mm

Visible Area from the front

This will be extra for overlap.

30mm